Title: Describe the radiation-protection features included in the design of a medical imaging department.
Course: Radiologic Technology II (14105-II) > Section: Applying Radiation-Protection Procedures

Description should include

- the primary use of each room
- workflow patterns
- patient accessibility
- equipment positioning
- wall, ceiling, and floor thicknesses
- construction materials
- background equivalent radiation time (BERT).

Process/Skill Questions:

- What are possible consequences if medical imaging departments lack radiation-protection features?
- Why is patient accessibility important in a medical imaging department?
- Why should room workflow be a consideration in crisis planning?