Title: Research requirements for continuing education and specializations in radiologic technology.
Course: Radiologic Technology II (14105-II) > Section: Exploring Careers in Radiologic Technology

Research should include

- review of the accreditation requirements as outlined by the ARRT
- review of the programmatic accreditation requirements from the Joint Review Committee on Education in Radiologic Technology (JRCERT)
- the difference between attending an accredited and a nonaccredited program
- academic and clinical requirements
- special modalities
- postgraduate programs
- maintenance of continuing education requirements after licensure.

Process/Skill Questions:

- What is the difference between national and regional accreditation?
- How many hours of continuing education are needed for recertification?
- Who would approve continuing education credits?
- What are the requirements for clinical and academic courses?