Title: Inspect, replace and/or align power train mounts.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: AUTOMATIC TRANSMISSION and TRANSAXLE: In-Vehicle Transmission and Transaxle

Inspection should include

- testing, replacing, or adjusting powertrain mounts and subframes
- checking for proper wheel alignment.

Process/Skill Questions:

- What are the procedures to inspect power train mounts?
- What are the procedures for proper cradle alignment?
- What are the causes of broken or worn power train mounts?