Title: Inspect external manual valve shift linkage, transmission range sensor/switch, and/or park/neutral position switch.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: AUTOMATIC TRANSMISSION and TRANSAXLE: In-Vehicle Transmission and Transaxle

Inspection should include

- using the proper methods to adjust the transmission linkages
- replacing the switches when necessary.

Process/Skill Questions:

- What are the proper procedures for adjusting a manual valve shift linkage?
- What are some problems related to incorrect range switch adjustment or manual valve adjustment?
- What are the types of transmission range switches?