Title: Research the need to perform calibration/recalibration, initialization, or relearn procedures as required.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: General

Research should include consulting OEM service information.

Process/Skill Questions:

- What are the consequences of not following OEM service procedures?
- What is the importance of access to current manufacturer service information?