Title: Inspect A/C system for signs of leaks.Inspect A/C system for signs of leaks.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: HEATING, VENTILATION AND AIR CONDITIONING

Inspection should include a leak test, using dyes or a refrigerant leak detector. Inspection should also include following service materials as well as federal and manufacturer guidelines.

Note: Environmental Protection Agency (EPA) Clean Air Act Section 609 required.

Process/Skill Questions:

- What specialized tools are needed to perform a leak test on an A/C system?
- What are the procedures to perform a leak test on an A/C system?
- What are the safety and environmental concerns when performing a leak test on an A/C system?