Title: Demonstrate knowledge of hazards related to high-voltage systems/electric vehicles.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: Foundational Tasks: xEV Vehicle Safety

Demonstration should include

- electrocution
- fire
- explosion, arc flash
- gases and fumes
- hazardous chemicals
- electromagnetic force (EMF)
- how to respond to emergency situations.

Process/Skill Questions:

- What are the three main hazards related to high-voltage systems?
- How can one prevent xEV-related high-voltage accidents?