Title: Demonstrate knowledge of the steps of an A/C performance test as recommended by manufacturer.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: HEATING, VENTILATION AND AIR CONDITIONING

Demonstration should include

- using industry temperature and pressure charts
- using a manifold gauge set
- comparing results with manufacturer specifications for the vehicle type.

Process/Skill Questions:

- What are the procedures for performing an A/C performance test?
- What tools are used to perform an A/C performance test?
- What problems can be identified by a performance test?