Title: Use wiring diagrams to trace electrical/electronic circuits.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: General

Use should include

- locating an appropriate diagram based on concern
- interpreting diagram symbols by using legends/key
- applying system knowledge and troubleshooting methods.

Process/Skill Questions:

- What does the ground symbol look like?
- What is the translation of the acronym AWG?
- What does a fuse symbol look like?