Title: Inspect and test switches, connectors, and wires of starter control circuits.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Starting System (Low Voltage)

Procedures should include

- checking the ignition switch
- checking the neutral safety switch
- checking the clutch safety switch
- checking the starter relay
- conducting a visual inspection of the wiring harness
- testing components, according to service materials and manufacturer guidelines.

Process/Skill Questions:

- What components are in a starter control circuit?
- How much voltage drop is allowed across the connector?
- How does a positive-engagement starter work?