Title: Identify ignition system components and configurations.
Course: Automotive Technology II (MLR 3-Year Program) (20104-IIA) > Section: ENGINE PERFORMANCE : Ignition System

Identification should include the locations and functions of the components of ignition systems such as

- distributor (conventional)
- distributorless
- coil-on-plug (COP).

Process/Skill Questions:

- Why is proper ignition timing critical, and how does it affect engine performance?
- What are the secondary ignition components?