Title: Describe the importance of the Virginia Unified Statewide Building Code (USBC), what it governs, and how to use it as a reference.
Course: Carpentry II (17003-II) > Section: Interpreting Blueprints

Description should include

- locating the official, updated code
- identifying the major sections and how to quickly find information
- identifying the rationale behind the code
- identifying the agency that enforces the code
- citing examples of penalties for noncompliance.

Process/Skill Questions:

- How is the USBC enforced?
- How can builders and carpenters avoid code violations?
- Aside from penalties, what dangers exist when participating in building projects that are not compliant with the USBC?

NCCER Carpentry Standards

Level One, Module Four (27104-13): Introduction to Construction Drawings, Specifications, and Layout

Module Four (27104-13) describes the information contained in construction drawings, including foundation, floor, and other plan view drawings, as well as how to read them. It also describes how to interpret schedules and specifications, and how to use the 3-4-5 rule to square buildings.

NCCER Core Curriculum: Introductory Craft Skills, 2015

00105-15 Introduction to Construction Drawings

Module Five (00105-15) provides trainees with the information and skills needed to read and understand construction drawings. This module includes a set of four oversize drawings, which is included as an Appendix in the Trainee Guide. The drawings are also available for download from www.nccerirc.com.