Title: Assemble floor framing detail on the sill plate.
Course: Carpentry II (17003-II) > Section: Framing a Floor

Assembly should include

- locating the wall and floor openings
- completing the layout, according to the building plan.

Process/Skill Questions:

- Which set of plans would be used to determine the floor layout?
- What specialty details accommodate floor framing?

NCCER Carpentry Standards

Level One, Module Five (27105-13): Floor Systems

Module Five (27105-13) describes the layout and construction procedures for floor systems, including how to read and interpret construction drawings and specifications, and how to identify different types of framing systems, floor system components, and floor system materials. It also covers how to estimate the amount of materials needed for a floor assembly and on some common alternative floor systems.