Title: Describe the concepts of voltage, current, and resistance in electricity.
Course: Technology of Robotic Design (21009-36) > Section: Applying the Basics of Control and Distribution of Energy

Description should include definitions of voltage, current, and resistance and a summary of their interrelationship, as stated in Ohm's law.

Process/Skill Questions:

- What effect does resistance have on voltage and current in a circuit?
- How are voltage, current, and resistance measured?
- What is the interrelationship of voltage, current, and resistance?
- What happens in a circuit when there is a break or interruption in current flow?