Title: Identify imaging techniques and nuclear-medicine tests.
Course: Medical Terminology (14154-II) > Section: Understanding Disciplines/Departments Involved in Healthcare Delivery

Identification should include

- X-rays
- computed tomography (CT)
- contrast studies
- ultrasound imaging
- magnetic resonance imaging (MRI)
- in vitro procedures
- in vivo procedures.

Process/Skill Questions:

- How would you describe each of the imaging techniques, tests, or procedures?
- In what situation(s) might each imaging technique, test, or procedure be used?
- How can one maintain confidentiality?
- How can one share one’s findings ethically?
- What is the difference between a CT scan and an MRI?
- What is the difference between an AP and a PA view?