Title: Maintain the work environment.
Course: Medical Administration (14153-36) > Section: Managing Office Activities

Maintenance should include

- following protocols for maintaining a secure work environment
- following protocols for maintaining a productive work environment
- following correct procedures for turning on, logging in and out, and shutting down the computer (e.g., maintaining secure passwords and logging out whenever leaving the workstation)
- troubleshooting basic problems related to the operation of the computer, according to the manufacturer’s specifications
- maintaining a neat and organized work area with necessary supplies and materials
- handling sensitive and confidential information.