Title: Diagnose (troubleshoot) the charging system for causes of undercharge, no-charge, or overcharge conditions.
Course: Automotive Technology III (20104-III) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Diagnosis and Repair

Diagnosis should include

- a reference to service materials and manufacturer guidelines
- the use of recommended testing equipment.

Process/Skill Questions:

- What might be the effect of a loose belt?
- What would a wet battery indicate?
- What is the effect of revolutions per minute (RPM)/idle speed being too low?