Title: Inspect, leak test, flush, and/or replace transmission/transaxle oil cooler, lines, and fittings.
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: Off-Vehicle Transmission and Transaxle Repair

Procedures should include

- using proper equipment to flow test and flush transmission oil cooler and lines
- inspecting or replacing oil cooler, lines, and fittings, as needed.

Process/Skill Questions:

- What is the normal flow rate through a transmission/transaxle cooler?
- Why is a transmission/transaxle cooler flushed?
- What factors indicate that the cooler needs to be replaced?