Title: Inspect and test HVAC system control panel assembly; determine the needed action.
Course: Automotive Technology III (20104-III) > Section: HEATING, VENTILATION, AND AIR CONDITIONING (HVAC): Operating Systems and Related Controls Diagnosis and Repair

Inspection should include

- actuating all functions of the control panel assembly
- determining the presence of any malfunctions
- referring to service materials and manufacturer guidelines.

Process/Skill Questions:

- What specialized tools should be used to test the HVAC controls?
- What procedures should be used to service the HVAC controls?
- What are some common problems with HVAC controls?