Title: Inspect and test fuel pumps and pump control systems for pressure, regulation, and volume; determine the needed action.
Course: Automotive Technology III (20104-III) > Section: ENGINE PERFORMANCE: Fuel, Air Induction, and Exhaust Systems Diagnosis and Repair

Procedure should include

- using a fuel pressure gauge
- performing a flow test with a graduated cylinder and stopwatch
- referring to service materials and manufacturer guidelines.

Process/Skill Questions:

- What methods are used to control fuel pressure?
- What lubricates the electric fuel pump?
- Why doesn’t the electric fuel pump create a fire hazard?