Title: Inspect, remove, and/or replace engine mounts.
Course: Automotive Technology III (20104-III) > Section: ENGINE REPAIR: General-Engine Diagnosis, Removal, and Reinstallation (R&R)

Procedure should include properly supporting the engine, to include electronically controlled engine mounts, and following manufacturer guidelines.

Process/Skill Questions:

- What are the types of engine mounts?
- How does a technician test an engine mount? Why should it be tested?
- What safety precautions should be taken when removing an engine mount?