Title: Check toe-out on turns (i.e., turning radius); determine the needed action.
Course: Automotive Technology III (20104-III) > Section: SUSPENSION AND STEERING: Wheel Alignment Diagnosis, Adjustment, and Repair

Check should include

- conducting a visual inspection, according to state inspection procedures
- using specialized tools, according to manufacturer guidelines.

Process/Skill Questions:

- How much difference can there be between the steering axis inclination (SAI) and included angle?
- How would a technician use SAI and the included angle to determine if a strut or a knuckle is bent?
- Is SAI adjustable? Explain.
- What are the key differences between positive and negative scrub radius? How does scrub radius affect the braking system?