Title: Identify common hand and power tools.
Course: Building Trades I (17009-I) > Section: Core Construction Skills: Applying Fundamental Construction Skills

Identification should include common tools used across construction trade areas.

Process/Skill Questions:

- What tools might be kept in the tool belt vs. on the truck?
- How often should a tool be inspected?
- What is the difference between a two-wire and a three-wire cord on a power tool?