Title: Identify technology input methods, given different technology uses, user populations, and contexts.
Course: Health Informatics (14157-I) > Section: Understanding Usability and Human Factors

Identification should include

- telemedicine technologies
- monitoring devices
- wearable devices
- voice command
- touch
- tablet input
- demographics
- age
- location.

Process/Skill Questions:

- What are the technology input methods that impact users in the health IT field?
- What demographics can affect technology and the users?
- What age barriers might hinder or assist users of technology?