Title: Demonstrate safety practices for flammable materials.
Course: Small Engine Repair (20110-18) > Section: Applying Safety Practices

Demonstration should include storage of flammable materials (e.g., oil, gasoline, solvents) according to the manufacturer or the Occupational Safety and Health Administration (OSHA), local ordinances, safety data sheet (SDS) specifications, or all.

Process/Skill Questions:

- What are the OSHA requirements for storage of oil, gasoline, and other solvents?
- What are safety data sheets (SDS)?
- What are your school/fire marshal's guidelines for storing flammable liquids?
- What could happen if these materials are stored incorrectly?