Title: (Optional) Service ignition parts.
Course: Small Engine Repair (20110-18) > Section: Repairing Ignition Systems

Service should include

- evaluating
- adjusting
- repairing or replacing

and be done in accordance with the manufacturer’s specifications and servicing procedures, using industry standards and instructor guidelines.

Process/Skill Questions:

- What are some requirements for replacing defective parts?
- What tests are available to determine whether the repair is successful?