Title: Maintain professional standards.
Course: Agricultural Education - Preparation (18003-II) > Section: Orienting the Student to Agricultural Science and Mathematics

Maintenance should include

  - identifying roles, responsibilities, and expectations
  - identifying and following housekeeping procedures
  - maintaining a clean, orderly, and safe working environment
  - reviewing the importance of equipment, tools, and supplies/material storage.

Process/Skill Questions:

  - Why is it important to understand individual roles, responsibilities, and expectations?
  - Why is it important to maintain housekeeping standards?
  - How can one maintain a clean, orderly, and safe working environment?
  - Why is it important to store items in their proper place?
  - What are some daily housekeeping tasks?