Title: Explain turbine engine operation.
Course: Aircraft Pilot Training I (20053-I) > Section: Examining Aircraft Instruments, Components, Systems, and Performance

Explanation should include the following:

- Air inlet
- Compressor
- Combustion chambers
- Turbine section
- Exhaust

Turbine engines are highly desirable aircraft powerplants. They are characterized by smooth operation and a high power-to-weight ratio, and they use readily available jet fuel.

PLT499