Title: Describe regulations related to the minimum equipment list.
Course: Aircraft Pilot Training I (20053-I) > Section: Exploring Regulations

Description should include the following:

- A Minimum Equipment List (MEL) is an FAA-approved document that allows an aircraft owner/operator to fly with certain item(s) inoperative.
- The FAA produces a Master Minimum Equipment List (MMEL) for most aircraft to use. They provide the format that is acceptable to the administrator.

PLT428