Title: Describe regulations related to persons authorized to perform maintenance.
Course: Aircraft Pilot Training I (20053-I) > Section: Exploring Regulations

Description should include the following:

- Each certificate holder shall have an inspection program and a program covering other maintenance, preventive maintenance, and alterations that ensures that
  - maintenance, preventive maintenance, and alterations performed by the certificate holder, or by other persons, are performed in accordance with the certificate holder's manual
  - competent personnel and adequate facilities and equipment are provided for the proper performance of maintenance, preventive maintenance, and alterations
  - each aircraft released to service is airworthy and has been properly maintained for operation under this part.

- Refer to Sec. 121.367, Maintenance, Preventive Maintenance, and Alterations Programs, for more information.

PLT439