Title: Inspect sprinkler systems.
Course: Firefighting II (15152-II) > Section: Examining Fire Detection, Alarm, and Suppression Systems

Inspection should include

- recording missing or damaged components
- checking power supply
- checking water supply
- testing pressure gauges
- checking for obstructions at sprinkler heads, including painted heads.

Process/Skill Questions:

- Why should a sprinkler head be free of paint?
- Why is it important to record all damaged components and their locations when inspecting sprinkler systems?
- How often should systems be inspected?
- What are the two types of power supply sources for a fire-annunciator control panel?