Title: Interpret building diagrams (including site plans).
Course: Industrial Maintenance Technology II (13203-II) > Section: Working with Technical Drawings

Interpretation demonstrates knowledge of symbols and schematics used in building drawings and site plans and includes

- identification of systems such as plumbing, HVAC, and electrical
- identification of basic building features such as doors, windows, rooms, hallways, stairs, loading docks
- identification of features such as contour, landscape, traffic issues, drainage, utilities.

Process/Skill Questions:

- What are some types of building drawings?
- What kinds of information are found on building drawings?