Title: Syllabus
Course: Industrial Maintenance Technology II (13203-II)

Copyright: 2016

Course Code: 8576

Suggested Grade Level: 11, 12

Duration: 36 weeks / 280 hours

Prerequisites: 8575

Course Description:

Industrial maintenance technicians repair and maintain commercial or industrial equipment in buildings. Students are taught safety and precision measurement skills and gain hands-on, practical experience in welding, hydraulics, pneumatics, HVAC, electricity, mechanical fundamentals, machine alignment, technical drawings, and quality control.

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," (https://law.lis.virginia.gov/admincode/title8/agency20/chapter120/section150/) or contact the Virginia Department of Education Office of Career, Technical and Adult Education at cte@doe.virginia.gov.