Title: Install mechanical system components.
Course: Industrial Maintenance Technology II (13203-II) > Section: Maintaining Systems

Installation requires the ability to identify system components and their functions and includes

- preparing the area for installation
- positioning and securing machinery
- aligning components
- connecting system to power source.

Process/Skill Questions:

- What are consequences of failure to fully prepare the installation area?
- What equipment should be used to position and secure machinery?
- What precautions should be taken prior to connecting the system to its power source?