Title: Describe aircraft batteries.
Course: Aircraft Pilot Training I (20053-I) > Section: Examining Aircraft Instruments, Components, Systems, and Performance

Description should include the following:

- Many aircraft are equipped with a battery switch that controls the electrical power to the aircraft in a manner similar to the master switch.
- An alternator switch is installed that permits the pilot to exclude the alternator from the electrical system in the event of alternator failure.

PLT109