Title: Describe regulations related to preventative maintenance.
Course: Aircraft Pilot Training I (20053-I) > Section: Exploring Regulations

Description should include the concept that preventive maintenance is regarded as simple or minor preservation operations and the replacement of small standard parts, not involving complex assembly operations.

PLT446